/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50528
Source Host           : localhost:3306
Source Database       : test

Target Server Type    : MYSQL
Target Server Version : 50528
File Encoding         : 65001

Date: 2013-06-02 17:52:57
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for `auctions`
-- ----------------------------
DROP TABLE IF EXISTS `auctions`;
CREATE TABLE `auctions` (
  `id` int(11) NOT NULL,
  `BiddingFor` varchar(64) NOT NULL DEFAULT '(none)',
  `InProgress` int(11) NOT NULL DEFAULT '0',
  `Bid` int(11) NOT NULL DEFAULT '0',
  `Bidder` int(11) NOT NULL DEFAULT '0',
  `Expires` int(11) NOT NULL DEFAULT '0',
  `Wining` varchar(24) NOT NULL DEFAULT '(none)',
  `Increment` int(11) NOT NULL DEFAULT '0',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=latin1;

-- ----------------------------
-- Records of auctions
-- ----------------------------
