/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50528
Source Host           : localhost:3306
Source Database       : test

Target Server Type    : MYSQL
Target Server Version : 50528
File Encoding         : 65001

Date: 2013-06-02 17:53:03
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for `bans`
-- ----------------------------
DROP TABLE IF EXISTS `bans`;
CREATE TABLE `bans` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `user_id` int(11) NOT NULL,
  `ip_address` varchar(32) DEFAULT NULL,
  `reason` varchar(156) DEFAULT NULL,
  `date_added` datetime DEFAULT NULL,
  `date_unban` datetime DEFAULT NULL,
  `status` int(1) DEFAULT NULL,
  `link` varchar(156) DEFAULT NULL,
  `admin` varchar(156) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=26904 DEFAULT CHARSET=latin1;

-- ----------------------------
-- Records of bans
-- ----------------------------
